E) TelescopeF) focus ring

K) prism table clamp

G,H) telescope {clampfine adjust

L) prism table {clampfine adjust

I, J) angle scale& vernier

A) gratingB) adjustable slit(twist)

C) CollimatorM) prism tablelevellingscrews