\section{MC-1 Errors \& Motion}

\setcounter{figure}{0}  \setcounter{equation}{0}
\input{p207_m01a} \newpage

\setcounter{figure}{0}  \setcounter{equation}{0}
\input{p207_m01b} \newpage

\setcounter{figure}{0}  \setcounter{equation}{0}
\input{p207_m01c} \newpage

